
DROP TABLE IF EXISTS _sft_migtest_table;
DROP TABLE IF EXISTS _sft_migtest_table2;
DROP TABLE IF EXISTS _sft_migtest_table3;
DROP TABLE IF EXISTS _sft_migtest_table4;

INSERT INTO _sft_db (db_rev, sft_ver, applied_at) VALUES (5, "0.0.1-pre-alpha1", CURRENT_TIMESTAMP);
